<template>
  <main class="bg-[#f7f9fc] box-border w-full h-screen flex pt-[8px] pb-[8px] pl-[8px] ">
    <div class="flex-1 flex gap-[8px]">
      <div class="flex-1 h-full">

      </div>

      <TaskList />
    </div>

    <SideMenus />
  </main>
</template>

<script setup lang="ts" name="Layout">
import TaskList from '@renderer/components/TaskList/index.vue'
import SideMenus from '@renderer/components/SideMenus/index.vue'
</script>